1

CM OST Version 7.1, March 1993

Copyright � 1993 Thinking Machines Corporation

Part I

V ector Unit Architectur e

2 T itle of Document

CM OST Version 7.1, March 1993

Copyright � 1993 Thinking

Machines Corporation