% proposal.tex
\documentclass[10pt]{article}
\input{preamble}

\date{\today }

\input{author}

\input{title}

\begin{document}

\bibliographystyle{plain}
\setcounter{page}{1}

\maketitle

\input{checklist}

\newpage
\pagestyle{empty}

% 1 page summary, required by NSF
\input{summary}

\newpage
\pagestyle{plain}
\setcounter{page}{1}

% GPG dictates section, so must use \subsection inside
\section*{Project Description}  %% limited to 15 pages 
\addcontentsline{toc}{section}{C. Project Description}

%% {\em The main body of the proposal should be a clear statement of
%% the work to be undertaken and should include: objectives for the
%% period of the proposed work and expected significance, relation to
%% longer-term goals of the PI's project, and relation to the present
%% state of knowledge in the field, to work in progress by the PI
%% under other support and to work in progress elsewhere.  The
%% statement should outline the general plan of work, including 
%% the broad design of activities to be undertaken, an adequate
%% description of experimental methods and procedures, and if
%% appropriate, plans for preservation, documentation, and sharing of
%% data, samples, physical collections and other related research
%% products.  Any substantial collaboration with individuals not
%% included in the budget should be described with a letter from 
%% each \ldots.} 

% a top-level Section, with Subsections
\input{objectives}

% more technical content
\input{technical}

% statement of work
\input{sow}

% related work
\input{related}

% prior NSF work by PI's
\input{priornsf}

% turn off pagination; no page limit for references
\pagestyle{empty}
\renewcommand{\refname}{References Cited}
% generate References Cited section
\bibliography{refsA,refsB}

\newpage

% description of facilities
\input{facilities}

\newpage

% budget justification
\input{budget}

\newpage

% bios for all Co-PI's (not required for Co-I's)
\input{bios}

\end{document}
